#
#
# Be careful to change this header. Any inconsitencies
# here will prevent the lighting model from working properly
#
#
# material definition emission, ambient, diffuse, spec, specind/alpha, cpack 
#
#
# check for right file - format
654321
#maxlight maxmaterial
8 327
#mat_cpk_s, mat_cpk_e
1 16
#mat_trs_s, mat_trs_e
17 32
#mat_trl_s, mat_trl_e
49 64
#mat_qua_s, mat_qua_e
33 48
#mat_bg0, mat_bg1
65 66
#mat_black, mat_white
67 68
#mat_cpak_qual mat_gold mat_silver
69 326 327
#mat_qua2D_s, mat_qua2D_e
70 325
#model
0.200000 0.200000 0.200000
0.000000
1.000000 0.000000
#light 1
0.000000 0.000000 0.000000 1
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#light 2
0.000000 0.000000 0.000000 1
1.000000 1.000000 1.000000
0.000000 0.000000 0.00000 0.000000
#light 3
0.000000 0.000000 0.000000 0
1.000000 0.000000 0.000000
-52.500000 -90.500000 90.000000 0.000000
#light 4
0.000000 0.000000 0.000000 0
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#light 5
0.000000 0.000000 0.000000 0
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#light 6
0.000000 0.000000 0.000000 0
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#light 7
0.000000 0.000000 0.000000 0
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#light 8
0.000000 0.000000 0.000000 0
1.000000 1.000000 1.000000
-45.000000 35.000000 90.000000 0.000000
#material 1
0.000000 0.000000 0.300000
0.000000 0.000000 0.000000
0.200000 0.100000 0.700000
0.300000 0.200000 1.000000
94.244019 1.000000
 1 0.694118 0.694118 0.000000 
#material 2
0.000000 0.000000 0.000000
0.150000 0.150000 1.000000
0.150000 0.150000 1.000000
0.800000 0.800000 0.800000
96.000000 1.000000
 2 0.145098 0.145098 1.000000 
#material 3
0.000000 0.000000 0.000000
0.700000 0.700000 0.000000
0.700000 0.700000 0.100000
0.800000 0.800000 0.800000
96.000000 1.000000
 3 1.000000 0.047059 0.047059 
#material 4
0.000000 0.000000 0.000000
1.000000 0.000000 0.000000
1.000000 0.100000 0.100000
0.800000 0.800000 0.800000
96.000000 1.000000
 4 0.894118 1.000000 1.000000 
#material 5
0.000000 0.000000 0.200000
0.000000 0.000000 0.000000
0.000000 0.100000 0.500000
0.300000 0.200000 1.000000
10.000000 1.000000
 5 0.247059 0.745098 0.247059 
